We request limited hardware support from PSI. This includes\\
\begin{enumerate}
\item  A temperature controlled tent for the set-up - probably the MuSun installation can be used,\\
\item 4 NIM and 1 VME crate and 2 racks,\\
\item Standard NIM electronic modules, to be specified. \\
\item Availability of liquid nitrogen for cooling of the germanium detector, if the mechanical cooler is identified as insufficient.\\
\end{enumerate}