We anticipate that the WP1, WP2 and WP3 can be executed in two 4 weeks PSI beam blocks scheduled in
2013 and 2014. The first experiment would be used to commission the full set-up and shake down its
components. The priority would be to perform most of the proton measurements, while simultaneously
measuring the X-rays for WP2. A first neutron measurement is also anticipated. This part of the experiment
is ready in spring 2013, and we would prefer an early running time during the 2013 schedule. After that,
the data would be analyzed and results reported at the BVR 2014. Depending on the outcome, in the run
2014, additional statistics data taking and systematic studies are foreseen to achieve publication quality
data. In addition, the large NaI would be installed for WP2 measurements. 

\vspace{5mm}

