\chapter{Conclusions}
\label{cha:conclusions}
AlCap is an experiment proposed at PSI to study charged particles, neutrons
and photons emitting after nuclear muon capture on aluminium. These
measurements are important for backgrounds and hit rates estimation of the new
generation of \mueconv experiments, COMET and Mu2e. In the first stage of the
COMET experiment, hit rate on its main tracking detector is anticipated to be
dominated by low energy protons following muon capture on an aluminium target,
which has never been measured.

The first run of the AlCap which aims for proton measurement has been carried
out in 2013. Data analysis is in progress. An initial analysis on partial data
was done with the main results are:
\begin{enumerate}
  \item Demonstration of the analysis chain from raw waveforms to physics
    events;
  \item Validation of the experimental method including: number of nuclear
    capture muons normalisation by muonic X-ray measurement, charged particle
    identification by specific energy loss, and unfolding of the proton energy
    spectrum using the iterative Bayesian method;
  \item Obtaining preliminary results on proton emission rate and spectrum:
    the proton spectrum has a peak at \SI{4}{\MeV}, then reduces exponentially
    with a decay constant of \SI{2.6}{\MeV}. The partial emission rate in the
    energy range from \SIrange{4}{8}{\MeV} is $(1.7 \pm 0.1)\%$, and the total
    emission rate assuming the shape holds for the whole spectrum is
    $(3.5\pm0.2)$.
\end{enumerate}
The proton rate and spectrum have been used to optimise the planned proton
absorber for the drift chamber of the COMET Phase-I. The resulted proton hit
rate with the baseline configuration is very small  compared with the current
figure. It is safe to remove the proton absorber altogether.
